\hypertarget{structkblib_1_1void__if}{}\doxysection{kblib\+::void\+\_\+if\texorpdfstring{$<$}{<} bool \texorpdfstring{$>$}{>} Struct Template Reference}
\label{structkblib_1_1void__if}\index{kblib::void\_if$<$ bool $>$@{kblib::void\_if$<$ bool $>$}}


{\ttfamily \#include $<$kblib/fakestd.\+h$>$}



\doxysubsection{Detailed Description}
\subsubsection*{template$<$bool$>$\newline
struct kblib\+::void\+\_\+if$<$ bool $>$}


Definition at line \mbox{\hyperlink{fakestd_8h_source_l00508}{508}} of file \mbox{\hyperlink{fakestd_8h_source}{fakestd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{fakestd_8h}{fakestd.\+h}}\end{DoxyCompactItemize}
