\hypertarget{structkblib_1_1detail_1_1nearest__ratio}{}\section{kblib\+:\+:detail\+:\+:nearest\+\_\+ratio$<$ Num, Den $>$ Struct Template Reference}
\label{structkblib_1_1detail_1_1nearest__ratio}\index{kblib\+::detail\+::nearest\+\_\+ratio$<$ Num, Den $>$@{kblib\+::detail\+::nearest\+\_\+ratio$<$ Num, Den $>$}}


{\ttfamily \#include $<$convert.\+h$>$}



\subsection{Detailed Description}
\subsubsection*{template$<$std\+::intmax\+\_\+t Num, std\+::intmax\+\_\+t Den$>$\newline
struct kblib\+::detail\+::nearest\+\_\+ratio$<$ Num, Den $>$}



Definition at line 410 of file convert.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\hyperlink{convert_8h}{convert.\+h}\end{DoxyCompactItemize}
