\hypertarget{structkblib_1_1detail_1_1filter__unsigned}{}\doxysection{kblib\+::detail\+::filter\+\_\+unsigned\texorpdfstring{$<$}{<} N, bool \texorpdfstring{$>$}{>} Struct Template Reference}
\label{structkblib_1_1detail_1_1filter__unsigned}\index{kblib::detail::filter\_unsigned$<$ N, bool $>$@{kblib::detail::filter\_unsigned$<$ N, bool $>$}}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename N, bool = std\+::is\+\_\+unsigned$<$\+N$>$\+::value$>$\newline
struct kblib\+::detail\+::filter\+\_\+unsigned$<$ N, bool $>$}


Definition at line \mbox{\hyperlink{fakestd_8h_source_l00824}{824}} of file \mbox{\hyperlink{fakestd_8h_source}{fakestd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{fakestd_8h}{fakestd.\+h}}\end{DoxyCompactItemize}
