\hypertarget{structkblib_1_1detail_1_1buildiota__impl}{}\doxysection{kblib\+::detail\+::buildiota\+\_\+impl\texorpdfstring{$<$}{<} Container, bool,... \texorpdfstring{$>$}{>} Struct Template Reference}
\label{structkblib_1_1detail_1_1buildiota__impl}\index{kblib::detail::buildiota\_impl$<$ Container, bool,... $>$@{kblib::detail::buildiota\_impl$<$ Container, bool,... $>$}}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename Container, bool, typename...$>$\newline
struct kblib\+::detail\+::buildiota\+\_\+impl$<$ Container, bool,... $>$}


Definition at line \mbox{\hyperlink{tdecl_8h_source_l00173}{173}} of file \mbox{\hyperlink{tdecl_8h_source}{tdecl.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{tdecl_8h}{tdecl.\+h}}\end{DoxyCompactItemize}
