\hypertarget{structkblib_1_1detail_1_1arithmetic__type}{}\doxysection{kblib\+::detail\+::arithmetic\+\_\+type\texorpdfstring{$<$}{<} T, bool \texorpdfstring{$>$}{>} Struct Template Reference}
\label{structkblib_1_1detail_1_1arithmetic__type}\index{kblib::detail::arithmetic\_type$<$ T, bool $>$@{kblib::detail::arithmetic\_type$<$ T, bool $>$}}


Filter only arithmetic types.  




{\ttfamily \#include $<$kblib/stringops.\+h$>$}

\doxysubsection*{Public Types}
\begin{DoxyCompactItemize}
\item 
using \mbox{\hyperlink{structkblib_1_1detail_1_1arithmetic__type_a691889e4ec8c53a00e428f5382f45b94}{type}} = void
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename T, bool = std\+::is\+\_\+arithmetic$<$\+T$>$\+::value$>$\newline
struct kblib\+::detail\+::arithmetic\+\_\+type$<$ T, bool $>$}
Filter only arithmetic types. 

If T is an arithmetic type, provides the member type = T. Otherwise, type = void. The primary template is for non-\/arithmetic types. 

Definition at line \mbox{\hyperlink{stringops_8h_source_l00087}{87}} of file \mbox{\hyperlink{stringops_8h_source}{stringops.\+h}}.



\doxysubsection{Member Typedef Documentation}
\mbox{\Hypertarget{structkblib_1_1detail_1_1arithmetic__type_a691889e4ec8c53a00e428f5382f45b94}\label{structkblib_1_1detail_1_1arithmetic__type_a691889e4ec8c53a00e428f5382f45b94}} 
\index{kblib::detail::arithmetic\_type$<$ T, bool $>$@{kblib::detail::arithmetic\_type$<$ T, bool $>$}!type@{type}}
\index{type@{type}!kblib::detail::arithmetic\_type$<$ T, bool $>$@{kblib::detail::arithmetic\_type$<$ T, bool $>$}}
\doxysubsubsection{\texorpdfstring{type}{type}}
{\footnotesize\ttfamily template$<$typename T , bool  = std\+::is\+\_\+arithmetic$<$\+T$>$\+::value$>$ \\
using \mbox{\hyperlink{structkblib_1_1detail_1_1arithmetic__type}{kblib\+::detail\+::arithmetic\+\_\+type}}$<$ T, bool $>$\+::type =  void}



Definition at line \mbox{\hyperlink{stringops_8h_source_l00088}{88}} of file \mbox{\hyperlink{stringops_8h_source}{stringops.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{stringops_8h}{stringops.\+h}}\end{DoxyCompactItemize}
