\hypertarget{structkblib_1_1default__extract}{}\doxysection{kblib\+::default\+\_\+extract\texorpdfstring{$<$}{<} Key, typename \texorpdfstring{$>$}{>} Struct Template Reference}
\label{structkblib_1_1default__extract}\index{kblib::default\_extract$<$ Key, typename $>$@{kblib::default\_extract$<$ Key, typename $>$}}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename Key, typename = void$>$\newline
struct kblib\+::default\+\_\+extract$<$ Key, typename $>$}


Definition at line \mbox{\hyperlink{trie_8h_source_l00140}{140}} of file \mbox{\hyperlink{trie_8h_source}{trie.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{trie_8h}{trie.\+h}}\end{DoxyCompactItemize}
