\hypertarget{struct_k_b_l_i_b___n_s_1_1void__if}{}\doxysection{KBLIB\+\_\+\+NS\+::void\+\_\+if\texorpdfstring{$<$}{<} bool \texorpdfstring{$>$}{>} Struct Template Reference}
\label{struct_k_b_l_i_b___n_s_1_1void__if}\index{KBLIB\_NS::void\_if$<$ bool $>$@{KBLIB\_NS::void\_if$<$ bool $>$}}


{\ttfamily \#include $<$kblib/fakestd.\+h$>$}



\doxysubsection{Detailed Description}
\subsubsection*{template$<$bool$>$\newline
struct KBLIB\+\_\+\+NS\+::void\+\_\+if$<$ bool $>$}


Definition at line \mbox{\hyperlink{fakestd_8h_source_l00508}{508}} of file \mbox{\hyperlink{fakestd_8h_source}{fakestd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{fakestd_8h}{fakestd.\+h}}\end{DoxyCompactItemize}
