\hypertarget{struct_k_b_l_i_b___n_s_1_1value__type__linear}{}\doxysection{KBLIB\+\_\+\+NS\+::value\+\_\+type\+\_\+linear\texorpdfstring{$<$}{<} Container, bool, T \texorpdfstring{$>$}{>} Struct Template Reference}
\label{struct_k_b_l_i_b___n_s_1_1value__type__linear}\index{KBLIB\_NS::value\_type\_linear$<$ Container, bool, T $>$@{KBLIB\_NS::value\_type\_linear$<$ Container, bool, T $>$}}


{\ttfamily \#include $<$kblib/fakestd.\+h$>$}



\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename Container, bool = key\+\_\+detected\+\_\+v$<$\+Container$>$, typename T = typename Container\+::value\+\_\+type$>$\newline
struct KBLIB\+\_\+\+NS\+::value\+\_\+type\+\_\+linear$<$ Container, bool, T $>$}


Definition at line \mbox{\hyperlink{fakestd_8h_source_l00927}{927}} of file \mbox{\hyperlink{fakestd_8h_source}{fakestd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{fakestd_8h}{fakestd.\+h}}\end{DoxyCompactItemize}
