\hypertarget{struct_k_b_l_i_b___n_s_1_1safe__signed}{}\doxysection{KBLIB\+\_\+\+NS\+::safe\+\_\+signed\texorpdfstring{$<$}{<} N, typename \texorpdfstring{$>$}{>} Struct Template Reference}
\label{struct_k_b_l_i_b___n_s_1_1safe__signed}\index{KBLIB\_NS::safe\_signed$<$ N, typename $>$@{KBLIB\_NS::safe\_signed$<$ N, typename $>$}}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename N, typename = void$>$\newline
struct KBLIB\+\_\+\+NS\+::safe\+\_\+signed$<$ N, typename $>$}


Definition at line \mbox{\hyperlink{fakestd_8h_source_l00837}{837}} of file \mbox{\hyperlink{fakestd_8h_source}{fakestd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{fakestd_8h}{fakestd.\+h}}\end{DoxyCompactItemize}
