\hypertarget{struct_k_b_l_i_b___n_s_1_1return__type}{}\doxysection{KBLIB\+\_\+\+NS\+::return\+\_\+type\texorpdfstring{$<$}{<} F \texorpdfstring{$>$}{>} Struct Template Reference}
\label{struct_k_b_l_i_b___n_s_1_1return__type}\index{KBLIB\_NS::return\_type$<$ F $>$@{KBLIB\_NS::return\_type$<$ F $>$}}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename F$>$\newline
struct KBLIB\+\_\+\+NS\+::return\+\_\+type$<$ F $>$}


Definition at line \mbox{\hyperlink{traits_8h_source_l00309}{309}} of file \mbox{\hyperlink{traits_8h_source}{traits.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{traits_8h}{traits.\+h}}\end{DoxyCompactItemize}
