\hypertarget{struct_k_b_l_i_b___n_s_1_1return__assert}{}\doxysection{KBLIB\+\_\+\+NS\+::return\+\_\+assert\texorpdfstring{$<$}{<} V, T \texorpdfstring{$>$}{>} Struct Template Reference}
\label{struct_k_b_l_i_b___n_s_1_1return__assert}\index{KBLIB\_NS::return\_assert$<$ V, T $>$@{KBLIB\_NS::return\_assert$<$ V, T $>$}}


Essentially just like std\+::enable\+\_\+if, but with a different name that makes it clearer what it does in the context of return type SFINAE.  




{\ttfamily \#include $<$kblib/fakestd.\+h$>$}



\doxysubsection{Detailed Description}
\subsubsection*{template$<$bool V, typename T$>$\newline
struct KBLIB\+\_\+\+NS\+::return\+\_\+assert$<$ V, T $>$}
Essentially just like std\+::enable\+\_\+if, but with a different name that makes it clearer what it does in the context of return type SFINAE. 

Definition at line \mbox{\hyperlink{fakestd_8h_source_l00537}{537}} of file \mbox{\hyperlink{fakestd_8h_source}{fakestd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{fakestd_8h}{fakestd.\+h}}\end{DoxyCompactItemize}
