\hypertarget{struct_k_b_l_i_b___n_s_1_1meta__type}{}\doxysection{KBLIB\+\_\+\+NS\+::meta\+\_\+type\texorpdfstring{$<$}{<} Ts \texorpdfstring{$>$}{>} Struct Template Reference}
\label{struct_k_b_l_i_b___n_s_1_1meta__type}\index{KBLIB\_NS::meta\_type$<$ Ts $>$@{KBLIB\_NS::meta\_type$<$ Ts $>$}}


{\ttfamily \#include $<$kblib/fakestd.\+h$>$}



\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename... Ts$>$\newline
struct KBLIB\+\_\+\+NS\+::meta\+\_\+type$<$ Ts $>$}


Definition at line \mbox{\hyperlink{fakestd_8h_source_l00497}{497}} of file \mbox{\hyperlink{fakestd_8h_source}{fakestd.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{fakestd_8h}{fakestd.\+h}}\end{DoxyCompactItemize}
