\hypertarget{struct_k_b_l_i_b___n_s_1_1detail__memory_1_1value__init}{}\doxysection{KBLIB\+\_\+\+NS\+::detail\+\_\+memory\+::value\+\_\+init Struct Reference}
\label{struct_k_b_l_i_b___n_s_1_1detail__memory_1_1value__init}\index{KBLIB\_NS::detail\_memory::value\_init@{KBLIB\_NS::detail\_memory::value\_init}}


{\ttfamily \#include $<$kblib/memory.\+h$>$}



\doxysubsection{Detailed Description}


Definition at line \mbox{\hyperlink{memory_8h_source_l00148}{148}} of file \mbox{\hyperlink{memory_8h_source}{memory.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{memory_8h}{memory.\+h}}\end{DoxyCompactItemize}
