\hypertarget{struct_k_b_l_i_b___n_s_1_1default__extract}{}\doxysection{KBLIB\+\_\+\+NS\+::default\+\_\+extract\texorpdfstring{$<$}{<} Key, typename \texorpdfstring{$>$}{>} Struct Template Reference}
\label{struct_k_b_l_i_b___n_s_1_1default__extract}\index{KBLIB\_NS::default\_extract$<$ Key, typename $>$@{KBLIB\_NS::default\_extract$<$ Key, typename $>$}}


\doxysubsection{Detailed Description}
\subsubsection*{template$<$typename Key, typename = void$>$\newline
struct KBLIB\+\_\+\+NS\+::default\+\_\+extract$<$ Key, typename $>$}


Definition at line \mbox{\hyperlink{trie_8h_source_l00140}{140}} of file \mbox{\hyperlink{trie_8h_source}{trie.\+h}}.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
kblib/\mbox{\hyperlink{trie_8h}{trie.\+h}}\end{DoxyCompactItemize}
